\documentstyle[12pt,aj_pt4]{article}
\pagestyle{empty}
\evensidemargin=0.0in
\oddsidemargin=0.0in

\begin{document}


\begin{deluxetable}{l c c c r r r r r r r r}
\tablenum{3a}
\tablecaption{Equivalent Widths of $\alpha$-Peak Elements}
\tablehead{\colhead{$\lambda$}&\colhead{}&
          \colhead{log gf}&\colhead{$\chi$}&
           \colhead{$\eta$ Aql}&
	   \colhead{RX Aur}&\colhead{CF Cas}&\colhead{CF Cas}&
           \colhead{DL Cas}&\colhead{DL Cas}&
	   \colhead{V Cen}&\colhead{V Cen} \nl
	   &&&\colhead{$\phi$=}&\colhead{0.721}&\colhead{0.304}&\colhead{0.655}&
	   \colhead{0.260}&
	   \colhead{0.140}&\colhead{0.389}&\colhead{0.178}&
	   \colhead{0.285}}
\small
\startdata
5645.62&\ion{Si}{1}&-2.065&4.91&80.7&55.2&58.1&49.8&46.1&54.6&60.1&58.1 \nl
5665.56&\ion{Si}{1}&-1.996&4.90&76.8&54.8&70.2&53.5&41.6&49.5&49.8&58.7 \nl
5690.43&\ion{Si}{1}&-1.808&4.91&81.8&70.3&90.0&55.7&$-$&75.8&62.1&70.0 \nl
5701.11&\ion{Si}{1}&-2.062&4.91&66.3&$-$&$-$&55.7&$-$&$-$&$-$&$-$  \nl
5793.08&\ion{Si}{1}&-1.956&4.91&$-$&60.4&72.3&46.6&65.3&64.3&66.4&64.4 \nl
5948.55&\ion{Si}{1}&-1.194&5.06&$-$&$-$&$-$&$-$&$-$&$-$&98.6&117.3 \nl
6125.03&\ion{Si}{1}&-1.556&5.59&59.6&40.3&44.4&42.9&35.0&42.6&39.4&45.8 \nl
6145.02&\ion{Si}{1}&-1.420&5.59&70.9&42.9&55.1&46.8&46.5&50.8&49.7&51.7 \nl
6155.14&\ion{Si}{1}&-0.763&5.59&97.7&89.7&97.2&87.5&$-$&99.7&94.8&94.6 \nl
6848.57&\ion{Si}{1}&-1.675&5.84&26.9&$-$&23&23.1&26&20.4&22.6&19.9 \nl
7405.79&\ion{Si}{1}&-0.698&5.59&$-$&$-$&$-$&$-$&$-$&$-$&110.3&$-$  \nl
7800.00&\ion{Si}{1}&-0.806&6.15&65.6&56.6&66.9&61.8&$-$&64.8&57.2&$-$  \nl
7849.98&\ion{Si}{1}&-0.849&6.16&$-$&$-$&69.3&56.9&55.4&$-$&$-$&$-$  \nl
8035.60&\ion{Si}{1}&-1.397&5.96&$-$&$-$&$-$&$-$&$-$&$-$&$-$&$-$  \nl
5581.97&\ion{Ca}{1}&-0.699&2.52&$-$&$-$&$-$&$-$&99.2&$-$&121.1&$-$  \nl
5588.76&\ion{Ca}{1}&-0.071&2.52&$-$&$-$&$-$&$-$&$-$&$-$&$-$&$-$  \nl
5590.12&\ion{Ca}{1}&-0.714&2.52&$-$&$-$&$-$&$-$&90.9&$-$&111.9&118 \nl
5867.57&\ion{Ca}{1}&-1.593&2.92&58.3&29&42.2&24.6&30.3&40.4&45.2&$-$  \nl
6122.22&\ion{Ca}{1}&-0.456&1.88&$-$&$-$&$-$&$-$&$-$&$-$&$-$&$-$  \nl
6161.29&\ion{Ca}{1}&-1.309&2.51&93.5&$-$&95.8&78.8&66.7&69.9&72.9&$-$  \nl
6166.44&\ion{Ca}{1}&-1.122&2.51&105.6&86.3&99&84.3&94.3&98.4&89.6&94 \nl
6169.04&\ion{Ca}{1}&-0.747&2.51&$-$&$-$&$-$&112.8&$-$&$-$&$-$&$-$  \nl
6169.55&\ion{Ca}{1}&-0.457&2.51&$-$&$-$&$-$&$-$&$-$&$-$&$-$&$-$  \nl
6471.66&\ion{Ca}{1}&-0.795&2.52&$-$&$-$&$-$&$-$&109.2&$-$&114.2&130.4 \nl
6572.80&\ion{Ca}{1}&-4.329&0&83.4&41.2&56.5&42.4&45.1&44.3&49.4&44.5 \nl
5774.04&\ion{Ti}{1}&0.368&3.29&30.4&18&$-$&12.6&$-$&28.3&15.5&14.4 \nl
5813.97&\ion{Ti}{1}&-2.077&1.06&16.8&$-$&$-$&$-$&$-$&$-$&$-$&$-$  \nl
5978.54&\ion{Ti}{1}&-0.584&1.87&$-$&$-$&35&24.1&$-$&$-$&$-$&$-$  \nl
6064.63&\ion{Ti}{1}&-1.947&1.04&$-$&$-$&$-$&5.2&6.8&$-$&10.9&$-$  \nl
6085.26&\ion{Ti}{1}&-0.954&1.05&$-$&52.7&75.4&40.8&36.3&48.3&45.1&48.5 \nl
6091.18&\ion{Ti}{1}&-0.438&2.26&$-$&38.5&$-$&25.4&9.8&16.1&20.4&32.5 \nl
6092.82&\ion{Ti}{1}&-1.394&1.88&$-$&7.5&$-$&$-$&$-$&$-$&$-$&$-$  \nl
6126.22&\ion{Ti}{1}&-1.406&1.06&56.8&30.7&37.2&34.1&29.9&36.7&33.1&44 \nl
6261.11&\ion{Ti}{1}&-0.49&1.42&93.9&50.5&78.4&57&46.3&57.9&54.3&62.7 \nl
5422.47&\ion{Ti}{2}&-3.228&1.56&$-$&$-$&64.4&64.4&$-$&73.1&64.9&65.3 \nl
5468.44&\ion{Ti}{2}&-2.066&2.59&85.2&$-$&90&65.3&75.3&74.3&86.7&55.7 \nl
6606.98&\ion{Ti}{2}&-2.823&2.05&82.3&72.1&70&61.1&71.4&88.8&71.3&70.7 \nl
\enddata
\end{deluxetable}

\begin{deluxetable}{l c c c r r r r r r r r}
\tablenum{3b}
\tablecaption{Equivalent Widths of $\alpha$-Peak Elements}
\tablehead{\colhead{$\lambda$}&\colhead{}&
          \colhead{log gf}&\colhead{$\chi$}&
          \colhead{$\delta$ Ceph}&
	   \colhead{X Cyg}&\colhead{$\zeta$ Gem}&\colhead{T Mon}&
           \colhead{CV Mon}&\colhead{S Nor}&\colhead{S Nor}&\colhead{QZ Nor} \nl
	   &&&\colhead{$\phi$=}&\colhead{0.399}&\colhead{0.432}&\colhead{0.410}&
	   \colhead{0.470}&
	   \colhead{$\phi$=0.363}&\colhead{$\phi$=0.550}&\colhead{$\phi$=0.570}&
	   \colhead{$\phi$=0.201}}
\small
\startdata
5645.62&\ion{Si}{1}&-2.065&4.91&64.3&99&86.4&$-$&47.6&57.9&55.1&56.6 \nl
5665.56&\ion{Si}{1}&-1.996&4.9&65.6&124.4&86.4&105.3&52.9&57.7&60.5&52.1 \nl
5690.43&\ion{Si}{1}&-1.808&4.91&75.1&123.7&93.4&130&76.1&70.2&76.9&64 \nl
5701.11&\ion{Si}{1}&-2.062&4.91&$-$&$-$&$-$&$-$&$-$&$-$&49.4&$-$  \nl
5793.08&\ion{Si}{1}&-1.956&4.91&72.1&114.7&85.4&114.7&56.5&70&75.1&71.2 \nl
5948.55&\ion{Si}{1}&-1.194&5.06&$-$&$-$&$-$&$-$&$-$&114.8&$-$&122.5 \nl
6125.03&\ion{Si}{1}&-1.556&5.59&52.4&84.5&64.1&67.7&35.9&55&50.8&52 \nl
6145.02&\ion{Si}{1}&-1.42&5.59&62&91.1&74.1&86.2&48.7&57.4&63.8&56.7 \nl
6155.14&\ion{Si}{1}&-0.763&5.59&106.9&$-$&130.9&$-$&92.3&110.6&$-$&102.7 \nl
6848.57&\ion{Si}{1}&-1.675&5.84&26.8&53.6&31.6&$-$&20.1&19.3&$-$&25.5 \nl
7405.79&\ion{Si}{1}&-0.698&5.59&$-$&$-$&$-$&$-$&$-$&$-$&$-$&$-$  \nl
7800.00&\ion{Si}{1}&-0.806&6.15&75.2&$-$&80.3&107.3&59.5&76.9&$-$&59.9 \nl
7849.98&\ion{Si}{1}&-0.849&6.16&$-$&$-$&$-$&$-$&50.6&76.8&$-$&42.6 \nl
8035.60&\ion{Si}{1}&-1.397&5.96&$-$&$-$&$-$&$-$&33&$-$&$-$&$-$  \nl
5581.97&\ion{Ca}{1}&-0.699&2.52&$-$&$-$&$-$&$-$&115.4&$-$&$-$&$-$  \nl
5588.76&\ion{Ca}{1}&-0.071&2.52&$-$&$-$&$-$&$-$&$-$&$-$&$-$&$-$  \nl
5590.12&\ion{Ca}{1}&-0.714&2.52&$-$&$-$&$-$&$-$&119.7&$-$&$-$&115.9 \nl
5867.57&\ion{Ca}{1}&-1.593&2.92&31.1&69.7&43.1&55.2&25.2&44.4&29&42.7 \nl
6122.22&\ion{Ca}{1}&-0.456&1.88&$-$&$-$&$-$&$-$&$-$&$-$&$-$&$-$  \nl
6161.29&\ion{Ca}{1}&-1.309&2.51&$-$&$-$&$-$&$-$&83.6&$-$&91.8&$-$  \nl
6166.44&\ion{Ca}{1}&-1.122&2.51&85.5&$-$&$-$&$-$&81.1&93&91&82.3 \nl
6169.04&\ion{Ca}{1}&-0.747&2.51&$-$&$-$&$-$&$-$&$-$&$-$&$-$&$-$  \nl
6169.55&\ion{Ca}{1}&-0.457&2.51&$-$&$-$&$-$&$-$&$-$&$-$&$-$&$-$  \nl
6471.66&\ion{Ca}{1}&-0.795&2.52&$-$&$-$&$-$&$-$&116.9&$-$&$-$&$-$  \nl
6572.80&\ion{Ca}{1}&-4.329&0&44&$-$&88.3&$-$&$-$&31.8&$-$&40.7 \nl
5774.04&\ion{Ti}{1}&0.368&3.29&$-$&57.7&$-$&29.1&13.3&18.6&$-$&$-$  \nl
5813.97&\ion{Ti}{1}&-2.077&1.06&14.7&$-$&$-$&29.6&$-$&$-$&$-$&$-$  \nl
5978.54&\ion{Ti}{1}&-0.584&1.87&$-$&$-$&$-$&$-$&$-$&$-$&35.7&$-$  \nl
6064.63&\ion{Ti}{1}&-1.947&1.04&9.5&49.7&21.9&$-$&$-$&$-$&24.6&11.4 \nl
6085.26&\ion{Ti}{1}&-0.954&1.05&56.2&$-$&98.3&$-$&$-$&44&40.8&45.4 \nl
6091.18&\ion{Ti}{1}&-0.438&2.26&17.7&82.5&$-$&$-$&14.6&$-$&$-$&15.7 \nl
6092.82&\ion{Ti}{1}&-1.394&1.88&$-$&$-$&$-$&15.5&$-$&$-$&$-$&$-$  \nl
6126.22&\ion{Ti}{1}&-1.406&1.06&36.4&120&75.5&$-$&30.1&37.2&34&31.1 \nl
6261.11&\ion{Ti}{1}&-0.49&1.42&69.1&$-$&122.5&$-$&59.8&65.9&92.3&62 \nl
5422.47&\ion{Ti}{2}&-3.228&1.56&$-$&$-$&$-$&$-$&66.1&89&113.6&69.9 \nl
5468.44&\ion{Ti}{2}&-2.066&2.59&$-$&$-$&$-$&145&96.5&75.1&89.5&106.7 \nl
6606.98&\ion{Ti}{2}&-2.823&2.05&78.5&109.2&93.4&130.8&91.1&82.9&88.4&84.4 \nl
\enddata
\end{deluxetable}

\begin{deluxetable}{l c c c r r r r r r r r}
\tablenum{3c}
\tablecaption{Equivalent Widths of $\alpha$-Peak Elements}
\tablehead{\colhead{$\lambda$}&\colhead{}&\colhead{log gf}&\colhead{$\chi$}&
           \colhead{TW Nor}&
	   \colhead{V340 Nor}&\colhead{EV Sct}&\colhead{S Sge}&
           \colhead{U Sgr}&\colhead{U Sgr}&\colhead{W Sgr}&\colhead{WZ Sgr} \nl
	   &&&\colhead{$\phi$=}&\colhead{0.227}&\colhead{0.193}&\colhead{0.695}&
	   \colhead{0.463}&
	   \colhead{0.152}&\colhead{0.447}&\colhead{0.031}&
	   \colhead{0.347}}
\small
\startdata
5645.62&\ion{Si}{1}&-2.065&4.91&56.2&61.6&28.6&71&52.4&72.8&45&50.5 \nl
5665.56&\ion{Si}{1}&-1.996&4.9&58.1&60.9&35.3&77.5&55&74.5&49.8&53.7 \nl
5690.43&\ion{Si}{1}&-1.808&4.91&81.3&67.3&42.6&81.5&66.9&70.9&53.9&74.2 \nl
5701.11&\ion{Si}{1}&-2.062&4.91&$-$&45.4&$-$&$-$&47.8&69.7&36&$-$  \nl
5793.08&\ion{Si}{1}&-1.956&4.91&82.1&$-$&44.4&82.1&70.2&80.2&58.5&67.3 \nl
5948.55&\ion{Si}{1}&-1.194&5.06&134.7&$-$&$-$&$-$&$-$&$-$&$-$&$-$  \nl
6125.03&\ion{Si}{1}&-1.556&5.59&56.3&49.2&27.3&57.1&46.8&48.4&37.6&43.6 \nl
6145.02&\ion{Si}{1}&-1.42&5.59&67.7&48.1&36.4&69.4&53.7&64.6&45&58.1 \nl
6155.14&\ion{Si}{1}&-0.763&5.59&101.7&95.6&72.2&115.1&97.7&$-$&82.4&$-$  \nl
6848.57&\ion{Si}{1}&-1.675&5.84&18.2&19.6&14.9&30&17&27.4&15&$-$  \nl
7405.79&\ion{Si}{1}&-0.698&5.59&134.1&$-$&$-$&$-$&$-$&$-$&103.4&$-$  \nl
7800.00&\ion{Si}{1}&-0.806&6.15&85.9&62.8&47.8&$-$&47.8&76.9&$-$&$-$  \nl
7849.98&\ion{Si}{1}&-0.849&6.16&$-$&$-$&46.9&$-$&$-$&$-$&$-$&$-$  \nl
8035.60&\ion{Si}{1}&-1.397&5.96&$-$&$-$&$-$&$-$&$-$&$-$&$-$&$-$  \nl
5581.97&\ion{Ca}{1}&-0.699&2.52&$-$&135.8&95.2&$-$&118.4&$-$&109.6&$-$  \nl
5588.76&\ion{Ca}{1}&-0.071&2.52&$-$&$-$&$-$&$-$&$-$&$-$&$-$&$-$  \nl
5590.12&\ion{Ca}{1}&-0.714&2.52&134.7&$-$&97.6&$-$&126&$-$&104.8&$-$  \nl
5867.57&\ion{Ca}{1}&-1.593&2.92&$-$&33.4&21.7&40.2&31.3&$-$&31.4&34.2 \nl
6122.22&\ion{Ca}{1}&-0.456&1.88&$-$&$-$&$-$&$-$&$-$&$-$&$-$&$-$  \nl
6161.29&\ion{Ca}{1}&-1.309&2.51&$-$&76.6&46.6&$-$&77.9&97.5&$-$&$-$  \nl
6166.44&\ion{Ca}{1}&-1.122&2.51&104&100.2&61.5&112.5&90.7&95.6&76.2&78.2 \nl
6169.04&\ion{Ca}{1}&-0.747&2.51&119.2&116.4&82.7&$-$&108.1&$-$&$-$&$-$  \nl
6169.55&\ion{Ca}{1}&-0.457&2.51&$-$&$-$&$-$&$-$&127.1&$-$&$-$&$-$  \nl
6471.66&\ion{Ca}{1}&-0.795&2.52&$-$&$-$&$-$&$-$&$-$&$-$&113.7&$-$  \nl
6572.80&\ion{Ca}{1}&-4.329&0&$-$&53.3&29.9&56.3&46.4&53&24.8&$-$  \nl
5774.04&\ion{Ti}{1}&0.368&3.29&$-$&$-$&10.9&30&15.9&22.6&$-$&$-$  \nl
5813.97&\ion{Ti}{1}&-2.077&1.06&$-$&$-$&$-$&17.7&$-$&22.4&$-$&$-$  \nl
5978.54&\ion{Ti}{1}&-0.584&1.87&40.3&29.3&23.6&$-$&$-$&$-$&$-$&$-$  \nl
6064.63&\ion{Ti}{1}&-1.947&1.04&$-$&$-$&$-$&14.8&$-$&$-$&$-$&$-$  \nl
6085.26&\ion{Ti}{1}&-0.954&1.05&53.8&$-$&25.8&76.8&34&$-$&33&$-$  \nl
6091.18&\ion{Ti}{1}&-0.438&2.26&$-$&16.4&15&$-$&$-$&20&13&$-$  \nl
6092.82&\ion{Ti}{1}&-1.394&1.88&$-$&$-$&$-$&$-$&$-$&$-$&$-$&$-$  \nl
6126.22&\ion{Ti}{1}&-1.406&1.06&$-$&31.8&11.2&48.4&25.4&42&21.6&18.8 \nl
6261.11&\ion{Ti}{1}&-0.49&1.42&76.5&65.9&33.1&88.3&56.2&78.1&47.9&55.6 \nl
5422.47&\ion{Ti}{2}&-3.228&1.56&$-$&$-$&$-$&$-$&91.7&92.7&$-$&$-$  \nl
5468.44&\ion{Ti}{2}&-2.066&2.59&68&90.6&76.3&$-$&79.3&71.1&101.3&106.8 \nl
6606.98&\ion{Ti}{2}&-2.823&2.05&88.3&64.4&43.7&85.3&71.5&83.2&68.3&76.1 \nl
\enddata
\end{deluxetable}

\begin{deluxetable}{l c c c r r r r r}
\tablenum{3d}
\tablecaption{Equivalent Widths of $\alpha$-Peak Elements}
\tablehead{\colhead{$\lambda$}&\colhead{}&
          \colhead{log gf}&\colhead{$\chi$}&
           \colhead{SZ Tau}&
	   \colhead{SW Vel}&\colhead{T Vul}&\colhead{T Vul}&
           \colhead{SV Vul} \nl &&&\colhead{$\phi$=}&
	   \colhead{0.333}&\colhead{0.347}&\colhead{0.089}&
	   \colhead{0.539}&\colhead{0.283}}
\small
\startdata
5645.62&\ion{Si}{1}&-2.065&4.91&54.8&$-$&34.6&59.8&96.6\nl
5665.56&\ion{Si}{1}&-1.996&4.9&50.7&102.8&38.9&56.6&95.2\nl
5690.43&\ion{Si}{1}&-1.808&4.91&64.4&104.5&55.8&$-$&119.6\nl
5701.11&\ion{Si}{1}&-2.062&4.91&$-$&97&21&38.8&103\nl
5793.08&\ion{Si}{1}&-1.956&4.91&56.7&88&46.3&69.5&$-$\nl
5948.55&\ion{Si}{1}&-1.194&5.06&105.5&$-$&$-$&$-$&$-$\nl
6125.03&\ion{Si}{1}&-1.556&5.59&44.7&70.7&32.1&47.9&84.8\nl
6145.02&\ion{Si}{1}&-1.42&5.59&42.1&86.8&38.7&51.7&79.7\nl
6155.14&\ion{Si}{1}&-0.763&5.59&89.8&134.9&80.2&105.2&$-$\nl
6848.57&\ion{Si}{1}&-1.675&5.84&22.8&38.5&10.7&18.5&$-$\nl
7405.79&\ion{Si}{1}&-0.698&5.59&$-$&$-$&$-$&$-$&$-$\nl
7800.00&\ion{Si}{1}&-0.806&6.15&62.6&88.8&41.9&65.4&107.3 \nl
7849.98&\ion{Si}{1}&-0.849&6.16&$-$&$-$&41.7&$-$&$-$  \nl
8035.5&\ion{Si}{1}&-1.397&5.96&$-$&$-$&41.7&$-$&$-$  \nl
5581.97&\ion{Ca}{1}&-0.699&2.52&$-$&$-$&$-$&$-$&$-$  \nl
5588.76&\ion{Ca}{1}&-0.071&2.52&$-$&$-$&$-$&$-$&$-$  \nl
5590.12&\ion{Ca}{1}&-0.714&2.52&$-$&$-$&$-$&$-$&$-$  \nl
5867.57&\ion{Ca}{1}&-1.593&2.92&23.4&41.1&16.4&33.9&48.5 \nl
6471.66&\ion{Ca}{1}&-0.795&2.52&101.5&$-$&85.9&$-$&$-$  \nl
6122.22&\ion{Ca}{1}&-0.456&1.88&$-$&$-$&$-$&$-$&$-$  \nl
6161.29&\ion{Ca}{1}&-1.309&2.51&$-$&$-$&44.5&71.4&$-$  \nl
6166.44&\ion{Ca}{1}&-1.122&2.51&71.1&138.1&61.9&83.8&$-$  \nl
6169.04&\ion{Ca}{1}&-0.747&2.51&99.6&$-$&$-$&122.1&$-$  \nl
6169.55&\ion{Ca}{1}&-0.457&2.51&121.5&$-$&$-$&135.1&$-$  \nl
6572.80&\ion{Ca}{1}&-4.329&0&$-$&$-$&$-$&42.5&89.5 \nl
5774.04&\ion{Ti}{1}&0.368&3.29&15.3&21.3&13.3&17.5&$-$  \nl
5813.97&\ion{Ti}{1}&-2.077&1.06&6.7&$-$&$-$&16.9&$-$  \nl
5978.54&\ion{Ti}{1}&-0.584&1.87&$-$&$-$&$-$&$-$&$-$  \nl
6064.63&\ion{Ti}{1}&-1.947&1.04&$-$&33&$-$&22.6&28.1 \nl
6085.26&\ion{Ti}{1}&-0.954&1.05&41&112.8&18.2&51.3&94.6 \nl
6091.18&\ion{Ti}{1}&-0.438&2.26&18.5&$-$&$-$&$-$&54.7 \nl
6092.82&\ion{Ti}{1}&-1.394&1.88&$-$&$-$&$-$&$-$&$-$  \nl
6126.22&\ion{Ti}{1}&-1.406&1.06&24.3&87.5&14&35.2&84.8 \nl
6261.11&\ion{Ti}{1}&-0.49&1.42&44.5&$-$&36.4&66.5&123 \nl
5422.47&\ion{Ti}{2}&-3.228&1.56&$-$&$-$&$-$&71&$-$  \nl
5468.44&\ion{Ti}{2}&-2.066&2.59&$-$&112.6&91.3&86.7&$-$  \nl
6606.98&\ion{Ti}{2}&-2.823&2.05&69&118.5&54.5&65.5&143.5 \nl
\enddata
\end{deluxetable}
\end{document}

