\documentstyle[aj_pt4]{article}
\begin{document}

\ptlandscape
\begin{deluxetable}{clccccccrrcrcccrl}
\tablewidth{620pt}
\tablenum{2}
\tablecaption{Results of Surface Photometry for $z<0.09$ Sample}
\tablehead{
\colhead{Abell}             & \colhead{IAU Name}           &
\colhead{$m_{GO}$}          & \colhead{$m_S$}              &
\colhead{$m_{24.5}$}        & \colhead{$M_{GO}$}           &
\colhead{$M_S$}             & \colhead{$M_{24.5}$}         &
\colhead{$r_{24.5}$}        & \colhead{$r_e$}              &
\colhead{$\epsilon_{24.5}$} & \colhead{$\theta_{24.5}$}    &
\colhead{$\sigma_{pl}$}     & \colhead{$\sigma_{r^{1/4}}$} &
\colhead{plexp}             & \colhead{N}}
\startdata
0014 & 0012-241  & 15.22 & 15.19 & 15.39 & -21.97 & -22.00 & -21.80 & 11.07 & 0.61 & 0.149 & 49 & 0.2626 & 0.2534 & -3.54 & 12 \nl
0027 & 0022-209B & 14.91 & 14.28 & 14.71 & -21.87 & -22.50 & -22.07 & 25.27 & 12.42 & 0.294 & 118 & 0.0195 & 0.0363 & -1.85 & 23 \nl
0074 & 0036-226B & 15.05 & 14.65 & 14.87 & -22.17 & -22.57 & -22.35 & 22.95 & 8.30 & 0.059 & -44 & 0.0441 & 0.0328 & -2.04 & 12 \nl
0075 & 0037+209 & 15.10 & 14.49 & 14.49 & -22.03 & -22.63 & -22.63 & 27.93 & 30.53 & 0.456 & 92 & 0.0416 & 0.0278 & -1.52 & 26 \nl
0077 & 0037+292 & 14.83 & 14.20 & 13.94 & -22.70 & -23.33 & -23.59 & 49.50 & 23.07 & 0.501 & 120 & 0.0364 & 0.0114 & -1.76 & 29 \nl
0085 & 0039-095B & 15.06 & 14.86 & 15.14 & -21.84 & -22.04 & -21.60 & 12.91 & 1.55 & 0.288 & 156 & 0.0444 & 0.0683 & -2.81 & 16 \nl
& 0039-095A & 13.82 & 13.13 & 13.08 & -23.08 & -23.77 & -23.66 & 36.33 & 16.04 & 0.397 & 144 & 0.0731 & 0.0416 & -1.78 & 28 \nl
& 0039-097 & 14.71 & 14.45 & 14.66 & -22.28 & -22.54 & -22.33 & 20.08 & 5.79 & 0.096 & 100 & 0.0461 & 0.0256 & -2.16 & 19 \nl
0102 & 0046+011 & 14.87 & 12.81 & 14.66 & -22.29 & -24.35 & -22.50 & 23.30 & 8.18 & 0.235 & 18 & 0.0228 & 0.0376 & -2.04 & 20 \nl
0104 & 0047+241 & 15.58 & 15.38 & 15.60 & -22.22 & -22.42 & -22.20 & 16.94 & 0.88 & 0.111 & 157 & 0.3257 & 0.3136 & -3.50 & 13 \nl
& 0047+242A & 15.82 & 15.60 & 15.85 & -21.98 & -22.20 & -21.95 & 15.39 & 1.17 & 0.273 & 33 & 0.0994 & 0.0758 & -3.20 & 13 \nl
0114 & 0050-220 & 14.89 & 14.51 & 14.78 & -22.08 & -22.47 & -22.11 & 20.97 & 7.29 & 0.150 & -23 & 0.0241 & 0.0261 & -2.05 & 19 \nl
0117 & 0053-102A & 15.20 & 14.94 & 15.22 & -21.64 & -21.90 & -21.62 & 14.17 & 4.08 & 0.113 & 120 & 0.0328 & 0.0245 & -2.26 & 16 \nl
& 0053-102B & 13.86 & 13.38 & 13.32 & -22.98 & -23.46 & -23.52 & 34.98 & 13.11 & 0.454 & -17 & 0.0320 & 0.0046 & -1.90 & 28 \nl
0119 & 0053-015 & 13.48 & 13.07 & 12.97 & -22.86 & -23.27 & -23.37 & 46.20 & 14.60 & 0.100 & 95 & 0.0490 & 0.1280 & -1.85 & 29 \nl
& 0053-016 & 14.07 & 13.7 & 13.92 & -22.27 & -22.57 & -22.42 & 25.10 & 6.30 & 0.050 & 40 & 0.0410 & 0.0840 & -2.10 & 23 \nl
0126 & 0057-145B & 14.61 & 14.32 & 14.68 & -22.21 & -22.50 & -22.14 & 15.90 & 3.46 & 0.142 & 1 & 0.0454 & 0.0214 & -2.37 & 17 \nl
0133 & 0100-221A & 14.03 & 13.47 & 13.34 & -23.01 & -23.57 & -23.70 & 53.33 & 21.23 & 0.494 & 18 & 0.0349 & 0.0093 & -1.76 & 31 \nl
0154 & 0108+173 & 14.13 & 13.53 & 13.78 & -23.08 & -23.67 & -23.42 & 37.59 & 13.86 & 0.134 & 72 & 0.0479 & 0.0185 & -1.90 & 24 \nl
0160 & 0110+152 & 13.73 & 13.25 & 13.43 & -22.65 & -23.13 & -22.95 & 36.03 & 14.98 & 0.370 & 97 & 0.0406 & 0.0141 & -1.79 & 29 \nl
0168 & 0112-000 & 14.49 & 14.23 & 14.44 & -21.90 & -22.16 & -21.95 & 21.23 & 5.11 & 0.318 & 19 & 0.0161 & 0.0296 & -2.22 & 22 \nl
0179 & 0119+193 & 14.66 & 14.46 & 14.66 & -22.19 & -22.40 & -22.20 & 19.48 & 3.69 & 0.262 & 32 & 0.0279 & 0.0222 & -2.39 & 20 \nl
0193 & 0122+084 & 13.20 & 12.83 & 12.85 & -23.40 & -23.77 & -23.75 & 49.41 & 23.71 & 0.253 & 59 & 0.0203 & 0.0299 & -1.69 & 31 \nl
0194 & 0123-016A & 12.13 & 11.77 & 11.92 & -22.23 & -22.59 & -22.44 & 26.79 & 9.58 & 0.360 & 112 & 0.0314 & 0.0142 & -1.77 & 34 \nl
& 0123-016B & 11.31 & 10.98 & 10.60E & -23.06 & -23.38 & -23.76E \nl
0225 & 0136+185 & 14.47 & 13.53 & 13.92 & -22.93 & -23.87 & -23.49 & 43.35 & 18.62 & 0.288 & 102 & 0.0430 & 0.0172 & -1.81 & 26 \nl
& 0135+185 & 15.26 & 14.84 & 15.21 & -22.15 & -22.56 & -22.20 & 22.66 & 5.49 & 0.145 & 111 & 0.0374 & 0.0308 & -2.25 & 18 \nl
0240 & 0139+073B & 14.70 & 14.17 & 14.56 & -22.45 & -22.98 & -22.60 & 27.39 & 8.71 & 0.183 & 26 & 0.0148 & 0.0371 & -2.06 & 22 \nl
& 0139+073A & 15.10 & 14.94 & 15.16 & -22.04 & -22.21 & -21.98 & 17.10 & 2.89 & 0.033 & 34 & 0.0511 & 0.0278 & -2.54 & 16 \nl
0257 & 0146+138 & 14.99 & 14.69 & 14.79 & -22.46 & -22.77 & -22.67 & 31.87 & 9.94 & 0.473 & 118 & 0.0163 & 0.0331 & -2.06 & 24 \nl
0262 & 0147+360 & 11.42 & 11.05 & 12.28 & -22.78 & -23.16 & -21.93 & 20.24 & 8.07 & 0.328 & 72 & 0.0351 & 0.0089 & -1.74 & 33 \nl
& 0149+359 & 11.88 & 11.46 & 11.10 & -22.33 & -22.75 & -23.11 & 44.60 & 29.50 & 0.400 & 40 & 0.0650 & 0.1580 & -1.34 & 38 \tablebreak
0278 & 0154+320 & 15.28 & 14.69 & 15.06 & -22.73 & -23.32 & -22.95 & 29.78 & 5.51 & 0.200 & 41 & 0.0469 & 0.0184 & -2.39 & 19 \nl
0415 & 0304-122 & 14.95 & 14.29 & 14.14 & -22.76 & -23.42 & -23.58 & 52.63 & 33.34 & 0.314 & -17 & 0.0450 & 0.0205 & -1.64 & 27 \nl
0419 & 0306-237 & 14.83 & 14.62 & 14.82 & -22.45 & -22.66 & -22.46 & 20.95 & 3.65 & 0.109 & 113 & 0.0556 & 0.0273 & -2.47 & 18 \nl
0423 & 0308-123 & 15.09 & 14.51 & 14.80 & -22.67 & -23.25 & -22.97 & 36.45 & 14.37 & 0.487 & 105 & 0.0202 & 0.0143 & -1.93 & 24 \nl
0428 & 0313-192 & 16.00 & 15.79 & 16.06 & -21.32 & -21.52 & -21.26 & 14.16 & 1.58 & 0.706 & 82 & 0.1146 & 0.0884 & -2.75 & 19 \nl
& 0314-192 & 15.19 & 14.93 & 15.13 & -22.12 & -22.38 & -22.19 & 21.52 & 5.09 & 0.235 & 107 & 0.0322 & 0.0145 & -2.30 & 19 \nl
0496 & 0431-133 & 12.94 & 12.35 & 12.20 & -22.77 & -23.36 & -23.51 & 49.20 & 26.55 & 0.521 & -6 & 0.0285 & 0.0031 & -1.56 & 37 \nl
& 0431-134 & 14.04 & 13.29 & 14.04 & -21.62 & -22.37 & -21.59 & 17.60 & 5.40 & 0.060 & 140 & 0.0490 & 0.0740 & -2.03 & 23 \nl
0514 & 0445-205 & 15.44 & 15.17 & 15.43 & -22.07 & -22.34 & -22.08 & 22.16 & 3.69 & 0.283 & -20 & 0.0323 & 0.0198 & -2.50 & 18 \nl
& 0446-205 & 15.48 & 15.03 & 15.30 & -22.03 & -22.48 & -22.21 & 25.20 & 9.19 & 0.159 & 82 & 0.0298 & 0.0136 & -2.04 & 19 \nl
0576 & 0717+559 & 13.84 & 13.19 & 13.96 & -22.25 & -22.90 & -22.14 & 22.31 & 6.28 & 0.053 & 98 & 0.0445 & 0.0286 & -2.05 & 23 \nl
0578 & 0720+670 & 15.31 & 14.93 & 15.18 & -22.64 & -23.02 & -22.77 & 25.32 & 4.84 & 0.091 & 81 & 0.0894 & 0.0602 & -2.43 & 17 \nl
& 0719+670 & 15.26 & 14.38 & 14.76E & -22.69 & -23.57 & -23.19E \nl
0595 & 0745+521 & 15.00 & 14.52 & 14.00 & -22.38 & -22.86 & -23.38 & 57.80 & 61.10 & 0.600 & 120 & 0.1460 & 0.1990 & -1.33 & 32 \nl
0623 & 0803-008 & 14.36 & 13.77 & 13.70 & -23.64 & -24.24 & -24.30 & 61.33 & 21.40 & 0.087 & 170 & 0.0338 & 0.0161 & -1.88 & 26 \nl
0628 & 0806+354B & 14.98 & 14.41 & 14.46 & -22.91 & -23.48 & -23.43 & 54.91 & 29.52 & 0.528 & 34 & 0.0212 & 0.0379 & -1.72 & 29 \nl
0690 & 0836+290 & 14.69 & 14.15 & 13.86 & -23.02 & -23.56 & -23.85 & 56.40 & 31.40 & 0.350 & 60 & 0.0600 & 0.0740 & -1.68 & 27 \nl
0754 & 0906-094 & 14.65 & 14.01 & 14.66 & -22.16 & -22.81 & -22.13 & 16.19 & 2.81 & 0.078 & 124 & 0.0357 & 0.0114 & -2.50 & 16 \nl
0757 & 0909+479 & 14.45 & 14.21 & 14.14 & -22.24 & -22.48 & -22.55 & 30.10 & 9.46 & 0.177 & 61 & 0.0133 & 0.0291 & -2.00 & 24 \nl
0763 & 0909+162 & 15.67 & 14.91 & 15.18 & -22.20 & -22.97 & -22.70 & 37.93 & 19.16 & 0.465 & 10 & 0.0365 & 0.0233 & -1.81 & 24 \nl
0858 & 0940+060 & 15.60 & 15.24 & 15.38 & -22.36 & -22.72 & -22.58 & 31.10 & 8.35 & 0.391 & -25 & 0.0339 & 0.0175 & -2.20 & 20 \nl
1066 & 1037+054 & 14.56 & 13.87 & 13.96E & -22.84 & -23.53 & -23.44E \nl
1142 & 1058+107 & 12.84 & 12.60 & 12.98 & -23.03 & -23.27 & -22.88 & 20.73 & 3.87 & 0.290 & -67 & 0.0498 & 0.0167 & -2.25 & 25 \nl
1145 & 1059+169 & 15.74 & 15.55 & 15.77 & -21.59 & -21.78 & -21.56 & 14.32 & 1.53 & 0.291 & 59 & 0.0447 & 0.0225 & -2.92 & 14 \nl
1185 & 1108+289B & 13.88 & & 14.09 & -21.73 & & -21.52 & 14.35 & 4.71 & 0.329 & 9 & 0.0720 & 0.0437 & -2.00 & 23 \nl
& 1108+289A & 13.89 & 13.76 & 13.97 & -21.72 & -21.85 & -21.64 & 15.18 & 3.38 & 0.153 & 41 & 0.0286 & 0.0109 & -2.22 & 22 \nl
& 1108+289C & 13.26 & 12.72 & 13.18 & -22.35 & -22.89 & -22.43 & 23.14 & 7.41 & 0.317 & 175 & 0.0475 & 0.0193 & -1.94 & 27 \nl
1187 & 1108+398 & 14.99 & 14.50 & 14.49 & -22.67 & -23.16 & -23.17 & 37.61 & 1.98 & 0.220 & 91 & 0.0356 & 0.0283 & -1.91 & 23 \nl
1190 & 1108+411 & 15.00 & 14.45 & 14.50 & -22.67 & -23.22 & -23.17 & 42.57 & 16.33 & 0.256 & 4 & 0.0270 & 0.0182 & -1.91 & 24 \nl
& 1108+410A & 15.36 & 14.27 & 15.29 & -22.31 & -23.40 & -22.38 & 22.90 & 5.39 & 0.360 & 2 & 0.0302 & 0.0382 & -2.34 & 19 \nl
& 1108+410B & 15.07 & 14.41 & 14.25 & -22.61 & -23.27 & -23.42 & 49.09 & 23.64 & 0.431 & -17 & 0.0447 & 0.0195 & -1.76 & 27 \nl
1213 & 1113+295A & 13.70 & 13.40 & 13.59 & -22.77 & -23.07 & -22.88 & 26.26 & 5.59 & 0.151 & 90 & 0.0484 & 0.0176 & -2.21 & 23 \nl
& 1113+295B & 14.47 & & 14.50 & -22.00 & & -21.97 & 16.82 & 3.26 & 0.275 & 130 & 0.0424 & 0.0171 & -2.38 & 19 \nl
& 1113+295C & 14.02 & 13.59 & 13.95 & -22.45 & -22.88 & -22.52 & 25.44 & 8.63 & 0.383 & 160 & 0.0223 & 0.0365 & -1.96 & 25 \nl
1238 & 1120+013 & 14.94 & 14.24 & 14.34 & -22.51 & -23.21 & -23.11 & 44.71 & 35.80 & 0.132 & 64 & 0.0315 & 0.0361 & -1.58 & 25 \nl
1257 & 1124+355 & 13.42 & 13.31 & 13.76 & -22.33 & -22.44 & -22.00 & 13.57 & 1.86 & 0.433 & 41 & 0.0970 & 0.0700 & -2.56 & 22 \nl
1291 & 1129+562 & 14.93 & 14.20 & 14.50 & -21.82 & -22.54 & -22.24 & 29.15 & 36.26 & 0.403 & 101 & 0.0403 & 0.0201 & -1.43 & 25 \nl
1307 & 1130+148 & 16.27 & 15.99 & 16.35 & -21.54 & -21.82 & -21.46 & 13.43 & 1.34 & 0.046 & 161 & 0.1959 & 0.1718 & -3.12 & 12 \nl
1308 & 1130-037 & 13.83 & 13.45 & 13.47 & -22.74 & -23.12 & -23.10 & 33.40 & 14.00 & 0.160 & 120 & 0.1450 & 0.1070 & -1.82 & 25 \nl
1314 & 1131+493 & 13.15 & 12.84 & 12.79 & -22.57 & -22.88 & -22.93 & 34.50 & 12.20 & 0.200 & 120 & 0.0680 & 0.1000 & -1.84 & 28 \nl
& 1132+492 & 13.82 & 13.62 & 13.65 & -21.90 & -22.10 & -22.07 & 21.30 & 5.60 & 0.100 & 40 & 0.0910 & 0.0290 & -2.07 & 23 \nl
& 1132+493 & 12.91 & 12.44 & 12.60 & -22.81 & -23.28 & -23.13 & 33.82 & 11.91 & 0.459 & 95 & 0.0218 & 0.0175 & -1.83 & 32 \nl
1318 & 1133+551 & 14.49 & 14.14 & 14.45 & -22.39 & -22.74 & -22.43 & 23.15 & 5.78 & 0.418 & 145 & 0.0205 & 0.0206 & -2.21 & 22 \nl
1334 & 1136-040 & 14.48 & 14.16 & 14.26 & -22.38 & -22.71 & -22.61 & 29.06 & 8.51 & 0.287 & 186 & 0.0132 & 0.0194 & -2.05 & 24 \nl
1367 & 1142+198 & 12.40 & 11.77 & 11.79 & -22.32 & -22.95 & -22.93 & 43.60 & 17.40 & 0.440 & 140 & 0.0740 & 0.2390 & -1.60 & 37 \nl
& 1141+202B & 12.02 & 11.42 & 11.54 & -22.69 & -23.29 & -23.18 & 42.04 & 16.46 & 0.241 & -20 & 0.0193 & 0.0117 & -1.64 & 37 \nl
1371 & 1142+157 & 15.00 & 14.47 & 14.32 & -22.31 & -22.84 & -22.99 & 37.81 & 20.97 & 0.329 & 45 & 0.0184 & 0.0275 & -1.74 & 25 \nl
1412 & 1153+736 & 15.69 & 15.16 & 15.43 & -22.12 & -22.66 & -22.38 & 25.92 & 9.40 & 0.394 & 133 & 0.0736 & 0.0529 & -2.04 & 20 \nl
1436 & 1157+565 & 14.72 & 14.36 & 14.74 & -22.46 & -22.82 & -22.43 & 29.08 & 13.92 & 0.412 & 153 & 0.0151 & 0.0205 & -1.86 & 24 \nl
1452 & 1200+519 & 14.66 & 14.08 & 14.15 & -22.48 & -23.06 & -22.99 & 37.30 & 19.50 & 0.400 & 63 & 0.1050 & 0.0750 & -1.74 & 24 \nl
1526 & 1219+140 & 15.70 & 15.55 & 15.77 & -22.00 & -22.16 & -21.93 & 12.97 & 1.98 & 0.064 & 69 & 0.1167 & 0.0992 & -2.78 & 11 \nl
1541 & 1224+091 & 15.89 & 15.76 & 15.96 & -22.06 & -22.19 & -21.99 & 13.47 & 1.36 & 0.218 & 91 & 0.2278 & 0.2212 & -3.08 & 11 \nl
1552 & 1227+120 & 14.94 & 14.12 & 14.53 & -22.90 & -23.71 & -23.31 & 29.54 & 12.13 & 0.334 & 77 & 0.0546 & 0.0318 & -1.94 & 21 \nl
& 1227+119 & 14.67 & 14.11 & 14.28 & -23.16 & -23.72 & -23.55 & 30.51 & 8.66 & 0.427 & 116 & 0.0602 & 0.0373 & -2.14 & 22 \nl
1569 & 1233+169 & 14.61 & 14.08 & 14.25 & -23.05 & -23.59 & -23.41 & 34.67 & 8.59 & 0.276 & 115 & 0.0607 & 0.0324 & -2.14 & 22 \nl
& 1233+168 & 15.20 & 14.42 & 14.85E & -22.46 & -23.25 & -22.81E \nl
1589 & 1238+188 & 14.85 & 14.55 & 14.66 & -22.60 & -22.91 & -22.80 & 28.63 & 7.32 & 0.252 & 56 & 0.0419 & 0.0138 & -2.18 & 21 \nl
1609 & 1243+267 & 14.97 & 14.51 & 14.58 & -23.00 & -23.46 & -23.38 & 41.21 & 14.46 & 0.245 & 22 & 0.0159 & 0.0197 & -2.00 & 23 \nl
1631 & 1250-150A & 14.29 & 13.46 & 13.90 & -22.17 & -23.00 & -22.56 & 36.40 & 18.25 & 0.206 & 132 & 0.0129 & 0.0216 & -1.72 & 27 \nl
& 1250-150B & 14.25 & 13.91 & 14.57 & -22.21 & -22.55 & -21.89 & 21.06 & 6.00 & 0.296 & 103 & 0.0138 & 0.0206 & -2.12 & 22 \nl
1644 & 1254-171 & 13.69 & 12.55 & 12.49 & -22.81 & -23.95 & -24.01 & 65.29 & 49.39 & 0.491 & 133 & 0.0398 & 0.0132 & -1.44 & 35 \nl
& 1255-170 & 14.42 & 13.68 & 13.80 & -22.08 & -22.82 & -22.70 & 37.70 & 25.04 & 0.381 & 165 & 0.0283 & 0.0134 & -1.61 & 28 \nl
1656 & 1256+281 & 12.98 & 12.74 & 13.40 & -21.93 & -22.17 & -21.51 & 12.60 & 2.50 & 0.050 & 90 & 0.1750 & 0.0990 & -2.26 & 21 \nl
& 1257+282 & 12.13 & 11.32 & 10.99 & -22.78 & -23.59 & -23.92 & 61.00 & 26.20 & 0.150 & 60 & 0.0810 & 0.1200 & -1.36 & 37 \nl
1668 & 1301+195 & 14.43 & 13.85 & 13.87 & -22.79 & -23.37 & -23.36 & 36.58 & 17.53 & 0.210 & 72 & 0.0582 & 0.0291 & -1.80 & 24 \nl
1749 & 1327+378 & 13.80 & 13.24 & 13.27 & -23.16 & -23.72 & -23.69 & 46.35 & 18.23 & 0.224 & 111 & 0.0229 & 0.0160 & -1.81 & 28 \nl
1775 & 1339+266A & 14.59 & 13.71 & 13.99E & -22.87 & -23.75 & -23.47E \nl
& 1339+266B & 14.59 & 13.62 & 13.99E & -22.87 & -23.84 & -23.47E \nl
1795 & 1346+268A & 14.33 & 13.73 & 12.86 & -22.78 & -23.38 & -24.25 & 92.10 & 93.00 & 0.600 & 12 & 0.0660 & 0.1580 & -1.32 & 37 \nl
& 1346+268B & 15.66 & 15.49 & 15.80 & -21.42 & -21.59 & -21.28 & 11.43 & 1.12 & 0.079 & 189 & 0.0460 & 0.0270 & -3.06 & 11 \nl
1825 & 1355+208A & 14.40 & 14.04 & 13.97 & -22.74 & -23.10 & -23.17 & 43.87 & 22.09 & 0.385 & 161 & 0.0089 & 0.0207 & -1.74 & 27 \nl
& 1355+208B & 14.52 & 14.05 & 14.14 & -22.62 & -23.09 & -23.00 & 37.64 & 14.22 & 0.462 & 45 & 0.0106 & 0.0221 & -1.88 & 27 \nl
1827 & 1355+219 & 14.45 & 14.01 & 14.31 & -22.84 & -23.28 & -22.98 & 30.74 & 9.56 & 0.156 & 207 & 0.0387 & 0.0096 & -2.05 & 22 \nl
1828 & 1355+185B & 14.86 & 14.58 & 14.84 & -22.26 & -22.54 & -22.27 & 20.22 & 3.06 & 0.393 & 32 & 0.0591 & 0.0339 & -2.54 & 20 \nl
1831 & 1356+282 & 14.63 & 14.10 & 14.28 & -22.44 & -22.98 & -22.79 & 32.11 & 10.09 & 0.610 & -28 & 0.0182 & 0.0207 & -2.13 & 20 \nl
1836 & 1359-113 & 13.23 & 12.82 & 12.74 & -22.73 & -23.14 & -23.22 & 41.50 & 13.80 & 0.350 & 25 & 0.1170 & 0.0380 & -1.78 & 30 \nl
1890 & 1415+084 & 14.70 & 14.29 & 14.33 & -22.21 & -22.62 & -22.58 & 32.20 & 16.50 & 0.400 & 25 & 0.0390 & 0.0670 & -1.80 & 26 \nl
1898 & 1418+253 & 15.15 & 14.13 & 14.86E & -22.48 & -23.51 & -22.78E \nl
1899 & 1419+179 & 15.19 & 14.45 & 15.24 & -21.58 & -22.32 & -21.54 & 20.48 & 7.88 & 0.237 & 56 & 0.0185 & 0.0408 & -1.98 & 20 \nl
1913 & 1424+169 & 14.29 & 14.06 & 14.32 & -22.44 & -22.67 & -22.41 & 20.67 & 2.70 & 0.322 & 121 & 0.0541 & 0.0253 & -2.60 & 20 \nl
& 1424+167 & 14.54 & 14.32 & 14.53 & -22.19 & -22.41 & -22.20 & 19.60 & 3.65 & 0.211 & 130 & 0.0605 & 0.0294 & -2.41 & 19 \nl
1939 & 1435+249 & 16.31 & 16.00 & 16.29 & -21.63 & -21.94 & -21.65 & 18.44 & 5.51 & 0.289 & 122 & 0.0378 & 0.0280 & -2.27 & 14 \nl
& 1435+250 & 16.02 & 15.72 & 16.02 & -21.93 & -22.22 & -21.92 & 19.89 & 7.54 & 0.381 & 116 & 0.0541 & 0.0809 & -2.13 & 16 \nl
1991 & 1452+188 & 14.24 & 13.61 & 13.49 & -22.71 & -23.33 & -23.46 & 44.11 & 26.95 & 0.409 & 9 & 0.0440 & 0.0193 & -1.63 & 29 \nl
2028 & 1507+077 & 14.81 & 14.17 & 14.13 & -22.83 & -23.47 & -23.51 & 42.77 & 25.04 & 0.240 & 71 & 0.0173 & 0.0182 & -1.71 & 25 \nl
2029 & 1508+059 & 14.26 & 13.48 & 12.78 & -23.35 & -24.13 & -24.83 & 96.00 & 55.50 & 0.600 & 24 & 0.1340 & 0.0370 & -1.55 & 34 \nl
2033 & 1508+065 & 14.60 & 14.12 & 14.05 & -23.18 & -23.66 & -23.73 & 49.49 & 20.82 & 0.528 & 37 & 0.0356 & 0.0223 & -1.98 & 21 \nl
2040 & 1510+076 & 14.78 & 14.44 & 14.88 & -21.62 & -21.95 & -21.51 & 13.84 & 2.42 & 0.216 & 137 & 0.0287 & 0.0261 & -2.48 & 18 \nl
2052 & 1514+072 & 13.17 & 12.43 & 12.05 & -22.64 & -23.38 & -23.76 & 60.93 & 48.58 & 0.347 & -21 & 0.0290 & 0.0039 & -1.38 & 37 \nl
2063 & 1520+087 & 13.21 & 12.61 & 12.55 & -22.65 & -23.24 & -23.30 & 46.14 & 33.29 & 0.333 & 153 & 0.0296 & 0.0049 & -1.48 & 34 \nl
2079 & 1525+290 & 14.75 & 14.10 & 14.43E & -22.52 & -23.17 & -22.87E \nl
2089 & 1530+282 & 16.34 & 16.11 & 16.45 & -21.21 & -21.44 & -21.09 & 12.46 & 1.25 & 0.216 & 3 & 0.0341 & 0.0452 & -3.05 & 12 \nl
2092 & 1531+312 & 15.91 & 15.31 & 15.46 & -21.41 & -22.01 & -21.86 & 27.96 & 40.42 & 0.206 & 3 & 0.0312 & 0.0277 & -1.42 & 21 \nl
2142 & 1556+274 & 16.36 & 15.81 & 16.30 & -21.66 & -22.21 & -21.72 & 17.82 & 4.44 & 0.167 & 63 & 0.0260 & 0.0244 & -2.40 & 14 \nl
2147 & 1559+161 & 13.24 & 12.82 & 12.85 & -22.63 & -23.05 & -23.02 & 34.55 & 13.75 & 0.582 & 11 & 0.0349 & 0.0079 & -1.77 & 33 \nl
2149 & 1600+540 & 15.23 & 14.96 & 15.22 & -22.14 & -22.41 & -22.15 & 19.75 & 4.74 & 0.155 & 43 & 0.0636 & 0.0346 & -2.40 & 17 \nl
2151 & 1602+178A & 13.76 & 13.25 & 13.75 & -22.19 & -22.70 & -22.20 & 20.74 & 8.16 & 0.015 & 86 & 0.0543 & 0.0325 & -1.90 & 23 \nl
& 1602+178B & 13.46 & 13.08 & 13.27 & -22.49 & -22.87 & -22.68 & 28.24 & 9.12 & 0.355 & 146 & 0.0430 & 0.0217 & -1.91 & 28 \nl
2152 & 1603+165 & 13.64 & 13.25 & 13.51 & -22.34 & -22.73 & -22.47 & 24.71 & 7.51 & 0.254 & -64 & 0.0216 & 0.0203 & -2.01 & 26 \nl
2162 & 1610+296 & 12.86 & 12.64 & 12.73 & -22.78 & -23.00 & -22.91 & 24.65 & 7.34 & 0.402 & 1 & 0.0401 & 0.0156 & -1.95 & 29 \nl
& 1610+297 & 13.68 & 13.52 & 13.72 & -21.96 & -22.12 & -21.92 & 16.61 & 2.45 & 0.396 & -5 & 0.0339 & 0.0117 & -2.40 & 24 \nl
2184 & 1619+503B & 14.88 & 14.62 & 14.99 & -22.03 & -22.28 & -21.91 & 17.89 & 4.63 & 0.275 & -10 & 0.0450 & 0.0199 & -2.24 & 19 \nl
2199 & 1626+396 & 12.45 & 11.93 & 11.68 & -23.06 & -23.58 & -23.83 & 57.80 & 24.60 & 0.500 & 30 & 0.1950 & 0.0870 & -1.59 & 37 \nl
2205 & 1630+129 & 15.85 & 15.44 & 15.82 & -22.14 & -22.55 & -22.18 & 23.11 & 8.08 & 0.093 & 117 & 0.0344 & 0.2510 & -2.11 & 16 \nl
2241 & 1657+325B & 15.05 & 14.67 & 14.82 & -22.14 & -22.52 & -22.37 & 25.81 & 9.70 & 0.116 & 112 & 0.0912 & 0.0691 & -1.97 & 20 \nl
& 1657+325A & 15.16 & 14.92 & 15.12 & -22.03 & -22.27 & -22.07 & 21.25 & 4.33 & 0.297 & 149 & 0.0573 & 0.0314 & -2.33 & 19 \nl
2248 & 1701+771 & 14.84 & 14.49 & 14.576 & -22.48 & -22.83 & -22.74 & 30.43 & 12.33 & 0.250 & -15 & 0.0103 & 0.0250 & -1.95 & 22 \nl
2249 & 1707+344 & 15.31 & 14.83 & 15.32 & -22.46 & -22.94 & -22.45 & 21.52 & 5.38 & 0.359 & 139 & 0.0543 & 0.0313 & -2.28 & 18 \nl
& 1708+344 & 15.63 & 15.04 & 15.70 & -22.14 & -22.73 & -22.06 & 21.68 & 5.05 & 0.165 & 83 & 0.0489 & 0.0279 & -2.30 & 16 \nl
2250 & 1709+397B & 14.85 & 14.45 & 14.72 & -22.44 & -22.84 & -22.57 & 26.71 & 6.32 & 0.238 & 98 & 0.0237 & 0.0171 & -2.22 & 21 \nl
2255 & 1712+640 & 15.56 & 14.91 & 15.44 & -22.19 & -22.84 & -22.31 & 24.93 & 6.76 & 0.043 & 31 & 0.0445 & 0.0316 & -2.22 & 17 \nl
& 1712+641 & 15.60 & 15.44 & 15.62 & -22.16 & -22.31 & -22.13 & 18.31 & 2.33 & 0.206 & 161 & 0.0602 & 0.0305 & -2.77 & 14 \nl
& 1713+641 & 15.14 & 13.40 & 14.70 & -22.62 & -24.35 & -23.05 & 35.58 & 14.45 & 0.418 & 66 & 0.0274 & 0.0162 & -1.92 & 23 \nl
2256 & 1706+786 & 14.52 & 13.27 & 13.22E & -22.53 & -23.78 & -22.83E \nl
& 1705+786 & 15.06 & 14.69 & 14.87 & -21.99 & -22.36 & -22.18 & 24.82 & 9.37 & 0.108 & 14 & 0.0123 & 0.0308 & -2.00 & 21 \nl
& 1706+787 & 15.09 & 14.47 & 15.09 & -21.96 & -22.58 & -21.96 & 20.58 & 5.51 & 0.065 & 180 & 0.0449 & 0.0607 & -2.23 & 19 \nl
& 1703+787 & 15.58 & 15.45 & 15.69 & -21.47 & -21.59 & -21.36 & 12.36 & 1.27 & 0.190 & 82 & 0.0916 & 0.0675 & -2.95 & 14 \nl
2293 & 1800+576 & 15.60 & 14.97 & 15.57 & -21.88 & -22.51 & -21.90 & 20.16 & 7.60 & 0.542 & 114 & 0.0684 & 0.0510 & -2.02 & 20 \nl
2304 & 1820+689 & 15.07 & 14.68 & 14.53 & -22.92 & -23.32 & -23.47 & 51.16 & 18.60 & 0.022 & -66 & 0.0386 & 0.0636 & -1.93 & 24 \nl
2311 & 1849+702 & 15.94 & 15.62 & 15.85 & -22.13 & -22.45 & -22.22 & 23.03 & 5.76 & 0.240 & 69 & 0.0273 & 0.0524 & -2.33 & 17 \nl
2331 & 2055-079 & 15.74 & 14.87 & 14.98 & -22.02 & -22.89 & -22.78 & 27.50 & 12.73 & 0.116 & 74 & 0.0470 & 0.0279 & -1.92 & 19 \nl
2361 & 2136-145 & 14.61 & 14.27 & 14.90 & -22.47 & -22.81 & -22.18 & 19.99 & 6.58 & 0.472 & 93 & 0.0253 & 0.0414 & -2.13 & 21 \nl
2372 & 2142-202 & 14.35 & 13.95 & 14.09 & -22.60 & -23.00 & -22.86 & 25.42 & 8.47 & 0.481 & 3 & 0.0219 & 0.0285 & -2.04 & 24 \nl
2382 & 2149-158B & 14.66 & 13.94 & 14.42 & -22.60 & -23.32 & -22.84 & 30.76 & 10.50 & 0.198 & 123 & 0.0254 & 0.0325 & -1.99 & 22 \nl
& 2149-158C & 14.91 & 14.58 & 14.82 & -22.32 & -22.68 & -22.44 & 19.18 & 3.97 & 0.076 & 88 & 0.0577 & 0.0341 & -2.40 & 17 \nl
2399 & 2154-080A & 14.56 & 14.04 & 14.29 & -22.51 & -23.03 & -22.78 & 31.12 & 7.70 & 0.203 & 55 & 0.0402 & 0.0091 & -2.11 & 23 \nl
& 2154-080B & 14.74 & 14.28 & 14.62 & -22.33 & -22.78 & -22.44 & 23.71 & 7.01 & 0.113 & 11 & 0.0225 & 0.0224 & -2.11 & 20 \nl
2401 & 2156-203 & 14.56 & 14.29 & 14.44 & -22.43 & -22.70 & -22.54 & 27.46 & 6.54 & 0.038 & 44 & 0.0318 & 0.0220 & -2.17 & 21 \nl
& 2155-203 & 14.04 & 13.51 & 13.59 & -22.87 & -23.41 & -23.33 & 45.09 & 14.68 & 0.128 & 113 & 0.0268 & 0.0091 & -1.89 & 27 \nl
2402 & 2155-100 & 15.16 & 14.51 & 14.52 & -22.58 & -23.23 & -23.22 & 40.69 & 14.05 & 0.355 & 59 & 0.0707 & 0.0406 & -1.94 & 24 \nl
2412 & 2201-216 & 15.06 & 14.17 & 14.76E & -22.45 & -23.33 & -22.75E \nl
2415 & 2203-058 & 14.97 & 14.53 & 14.69 & -22.10 & -22.54 & -22.38 & 28.03 & 15.75 & 0.125 & 146 & 0.0242 & 0.0101 & -1.79 & 22 \nl
& 2202-057 & 15.14 & 14.74 & 15.34 & -21.93 & -22.33 & -21.73 & 15.73 & 2.87 & 0.120 & 134 & 0.0487 & 0.0423 & -2.52 & 16 \nl
2420 & 2207-124 & 15.06 & 14.48 & 14.06 & -22.75 & -23.33 & -23.76 & 68.15 & 40.95 & 0.631 & 41 & 0.0115 & 0.0177 & -1.63 & 32 \nl
2448 & 2229-086 & 14.46 & 13.98 & 13.82 & -23.34 & -23.82 & -23.98 & 53.40 & 18.80 & 0.225 & 60 & 0.0980 & 0.0420 & -1.92 & 27 \nl
& 2228-087 & 14.88 & 14.36 & 14.39 & -22.92 & -23.44 & -23.41 & 41.80 & 15.50 & 0.300 & 40 & 0.0920 & 0.0660 & -1.92 & 22 \nl
2462 & 2236-176 & 14.56 & 14.03 & 13.79 & -22.85 & -23.38 & -23.62 & 53.50 & 36.60 & 0.250 & 130 & 0.0570 & 0.0850 & -1.60 & 28 \nl
2495 & 2247+106B & 15.25 & 14.44 & 14.01 & -22.43 & -23.23 & -23.66 & 52.58 & 39.62 & 0.545 & 229 & 0.0358 & 0.0141 & -1.54 & 29 \nl
2524 & 2300+174 & 15.55 & 15.17 & 15.54 & -22.23 & -22.62 & -22.24 & 20.36 & 2.77 & 0.174 & 46 & 0.0686 & 0.0448 & -2.70 & 16 \nl
2538 & 2305-201B & 14.99 & 14.60 & 14.70 & -22.80 & -23.20 & -23.09 & 32.20 & 7.95 & 0.070 & 56 & 0.0558 & 0.0251 & -2.23 & 19 \nl
& 2305-201A & 15.74 & 15.40 & 15.84 & -22.06 & -22.39 & -21.96 & 17.77 & 1.56 & 0.096 & 212 & 0.1318 & 0.1063 & -3.06 & 13 \nl
& 2306-201 & 15.76 & 15.59 & 15.83 & -22.03 & -22.20 & -21.97 & 17.47 & 1.41 & 0.092 & 46 & 0.0989 & 0.0669 & -3.14 & 12 \nl
2566 & 2313-207 & 15.28 & 14.74 & 14.68 & -22.47 & -23.01 & -23.07 & 42.33 & 16.75 & 0.421 & 156 & 0.0331 & 0.0100 & -1.82 & 25 \nl
2589 & 2321+164 & 14.88 & 14.65 & 14.97 & -21.37 & -21.60 & -21.28 & 14.33 & 4.32 & 0.092 & 98 & 0.0468 & 0.0247 & -2.15 & 18 \nl
2593 & 2322+143A & 14.86 & 14.04 & 14.99 & -21.40 & -22.22 & -21.27 & 12.48 & 2.92 & 0.102 & 45 & 0.0349 & 0.0071 & -2.35 & 17 \nl
& 2322+143B & 14.48 & 14.22 & 14.49 & -21.78 & -22.04 & -21.77 & 18.30 & 4.96 & 0.184 & 72 & 0.0270 & 0.0078 & -2.15 & 21 \nl
2597 & 2322-123 & 15.25 & 14.78 & 14.73 & -22.59 & -23.06 & -23.11 & 37.91 & 12.88 & 0.625 & -43 & 0.0441 & 0.0183 & -1.97 & 26 \nl
2622 & 2332+270 & 14.47 & 13.92 & 14.18 & -22.72 & -23.26 & -23.01 & 35.68 & 14.38 & 0.383 & 55 & 0.0358 & 0.0100 & -1.87 & 26 \nl
2626 & 2333+208 & 14.12 & 13.55 & 13.59 & -22.84 & -23.41 & -23.37 & 36.20 & 17.87 & 0.379 & 153 & 0.0707 & 0.0399 & -1.72 & 27 \nl
2634 & 2335+267 & 12.61 & 12.09 & 11.88 & -23.06 & -23.58 & -23.79 & 54.20 & 26.60 & 0.400 & 40 & 0.1020 & 0.1130 & -1.58 & 35 \nl
2637 & 2336+212 & 15.06 & 14.79 & 15.04 & -22.40 & -22.67 & -22.42 & 20.73 & 4.29 & 0.093 & 155 & 0.0577 & 0.0280 & -2.38 & 17 \nl
2656 & 2342-042 & 14.63 & 14.07 & 13.99 & -22.97 & -23.54 & -23.62 & 46.78 & 18.58 & 0.349 & 167 & 0.0586 & 0.0297 & -1.85 & 26 \nl
2660 & 2342-261 & 14.09 & 13.48 & 13.93 & -22.62 & -23.23 & -22.78 & 28.11 & 9.50 & 0.423 & 144 & 0.0451 & 0.0206 & -1.95 & 25 \nl
2665 & 2348+058 & 14.28 & 13.35 & 13.54 & -22.62 & -23.56 & -23.37 & 48.04 & 26.18 & 0.386 & 83 & 0.0320 & 0.0075 & -1.65 & 30 \nl
\enddata

\end{deluxetable}
\end{document}

